INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1694622952333725698, 'OP_INFO', '0', '[0],', '工序信息', 'fa-star', '/opInfo', 999, 1, 'Y', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-08-24 16:09:31', '2023-08-24 16:09:31', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1694622952333725699, 'OP_INFO_ADD', 'OP_INFO', '[0],[OP_INFO],', '工序信息添加', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-08-24 16:09:31', '2023-08-24 16:09:31', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1694622952333725700, 'OP_INFO_EDIT', 'OP_INFO', '[0],[OP_INFO],', '工序信息修改', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-08-24 16:09:31', '2023-08-24 16:09:31', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1694622952333725701, 'OP_INFO_DELETE', 'OP_INFO', '[0],[OP_INFO],', '工序信息删除', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-08-24 16:09:31', '2023-08-24 16:09:31', 1, 1);
