INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1717093235707576321, 'PLC_INTERACTIVE_DATA', '0', '[0],', 'plc交互数据', 'fa-star', '/plcInteractiveData', 999, 1, 'Y', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-10-25 16:18:24', '2023-10-25 16:18:24', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1717093235707576322, 'PLC_INTERACTIVE_DATA_ADD', 'PLC_INTERACTIVE_DATA', '[0],[PLC_INTERACTIVE_DATA],', 'plc交互数据添加', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-10-25 16:18:24', '2023-10-25 16:18:24', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1717093235707576323, 'PLC_INTERACTIVE_DATA_EDIT', 'PLC_INTERACTIVE_DATA', '[0],[PLC_INTERACTIVE_DATA],', 'plc交互数据修改', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-10-25 16:18:24', '2023-10-25 16:18:24', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1717093235707576324, 'PLC_INTERACTIVE_DATA_DELETE', 'PLC_INTERACTIVE_DATA', '[0],[PLC_INTERACTIVE_DATA],', 'plc交互数据删除', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-10-25 16:18:24', '2023-10-25 16:18:24', 1, 1);
