INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1678648680507469826, 'SCANNER_CONFIG', '0', '[0],', '扫描枪配置表', 'fa-star', '/scannerConfig', 999, 1, 'Y', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-11 14:13:27', '2023-07-11 14:13:27', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1678648680507469827, 'SCANNER_CONFIG_ADD', 'SCANNER_CONFIG', '[0],[SCANNER_CONFIG],', '扫描枪配置表添加', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-11 14:13:27', '2023-07-11 14:13:27', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1678648680507469828, 'SCANNER_CONFIG_EDIT', 'SCANNER_CONFIG', '[0],[SCANNER_CONFIG],', '扫描枪配置表修改', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-11 14:13:27', '2023-07-11 14:13:27', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1678648680507469829, 'SCANNER_CONFIG_DELETE', 'SCANNER_CONFIG', '[0],[SCANNER_CONFIG],', '扫描枪配置表删除', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-11 14:13:27', '2023-07-11 14:13:27', 1, 1);
