INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1685889759954841602, 'REPAIR_MANAGE_INFO', '0', '[0],', '返修管理表', 'fa-star', '/repairManageInfo', 999, 1, 'Y', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-31 13:46:55', '2023-07-31 13:46:55', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1685889759954841603, 'REPAIR_MANAGE_INFO_ADD', 'REPAIR_MANAGE_INFO', '[0],[REPAIR_MANAGE_INFO],', '返修管理表添加', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-31 13:46:55', '2023-07-31 13:46:55', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1685889759954841604, 'REPAIR_MANAGE_INFO_EDIT', 'REPAIR_MANAGE_INFO', '[0],[REPAIR_MANAGE_INFO],', '返修管理表修改', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-31 13:46:55', '2023-07-31 13:46:55', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1685889759954841605, 'REPAIR_MANAGE_INFO_DELETE', 'REPAIR_MANAGE_INFO', '[0],[REPAIR_MANAGE_INFO],', '返修管理表删除', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-07-31 13:46:55', '2023-07-31 13:46:55', 1, 1);
