INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1625743017943212033, 'MATERIAL_SHORTAGE_ALARM', '0', '[0],', '缺料报警', 'fa-star', '/materialShortageAlarm', 999, 1, 'Y', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-15 14:25:14', '2023-02-15 14:25:14', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1625743017943212034, 'MATERIAL_SHORTAGE_ALARM_ADD', 'MATERIAL_SHORTAGE_ALARM', '[0],[MATERIAL_SHORTAGE_ALARM],', '缺料报警添加', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-15 14:25:14', '2023-02-15 14:25:14', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1625743017943212035, 'MATERIAL_SHORTAGE_ALARM_EDIT', 'MATERIAL_SHORTAGE_ALARM', '[0],[MATERIAL_SHORTAGE_ALARM],', '缺料报警修改', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-15 14:25:14', '2023-02-15 14:25:14', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1625743017943212036, 'MATERIAL_SHORTAGE_ALARM_DELETE', 'MATERIAL_SHORTAGE_ALARM', '[0],[MATERIAL_SHORTAGE_ALARM],', '缺料报警删除', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-15 14:25:14', '2023-02-15 14:25:14', 1, 1);
