INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1627938836486242306, 'EQUIPMENT_MAINTAIN_TASK', '0', '[0],', '保养任务', 'fa-star', '/equipmentMaintainTask', 999, 1, 'Y', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-21 15:50:38', '2023-02-21 15:50:38', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1627938836486242307, 'EQUIPMENT_MAINTAIN_TASK_ADD', 'EQUIPMENT_MAINTAIN_TASK', '[0],[EQUIPMENT_MAINTAIN_TASK],', '保养任务添加', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-21 15:50:38', '2023-02-21 15:50:38', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1627938836486242308, 'EQUIPMENT_MAINTAIN_TASK_EDIT', 'EQUIPMENT_MAINTAIN_TASK', '[0],[EQUIPMENT_MAINTAIN_TASK],', '保养任务修改', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-21 15:50:38', '2023-02-21 15:50:38', 1, 1);
INSERT INTO `sys_menu`(`MENU_ID`, `CODE`, `PCODE`, `PCODES`, `NAME`, `ICON`, `URL`, `SORT`, `LEVELS`, `MENU_FLAG`, `DESCRIPTION`, `STATUS`, `NEW_PAGE_FLAG`, `OPEN_FLAG`, `SYSTEM_TYPE`, `CREATE_TIME`, `UPDATE_TIME`, `CREATE_USER`, `UPDATE_USER`) VALUES (1627938836486242309, 'EQUIPMENT_MAINTAIN_TASK_DELETE', 'EQUIPMENT_MAINTAIN_TASK', '[0],[EQUIPMENT_MAINTAIN_TASK],', '保养任务删除', 'fa-star', '', 999, 2, 'N', '', 'ENABLE', '', '', 'BASE_SYSTEM', '2023-02-21 15:50:38', '2023-02-21 15:50:38', 1, 1);
